en	Your shop is in debug mode.

en	Your shop is in maintenance.

en	Your visitors and customers cannot access your shop while in maintenance mode.%s To manage the maintenance settings, go to Shop Parameters > Maintenance tab.

en	No new order for now :(

en	No new customer for now :(

en	No new message for now.

en	registered

en	All the PHP errors and messages are displayed. When you no longer need it, [1]turn off[/1] this mode.

en	Your store is in debug mode.

en	Your store is in maintenance mode.

en	Your visitors and customers cannot access your store while in maintenance mode.

en	To manage the maintenance settings, go to Shop Parameters > General > Maintenance tab.

en	Admins can access the store front office without storing their IP.

en	Orders[1][/1]

en	Customers[1][/1]

en	Messages[1][/1]

en	from

en	An error occurred while updating new window property.

en	An error occurred while updating the new window property for this object.

en	Have you checked your [1][2]abandoned carts[/2][/1]?[3]Your next order could be hiding there!

en	Are you active on social media these days?

en	Seems like all your customers are happy :)