en	You can choose to keep your images stored in the previous system. There's nothing wrong with that.

en	After moving all of your product images, set the "Use the legacy image filesystem" option above to "No" for best performance.

en	Be careful! Depending on the options selected, former manually uploaded thumbnails might be erased and replaced by automatically generated thumbnails.

en	Also, regenerating thumbnails for all existing images can take several minutes, please be patient.

en	If you delete this image format, the theme won't be able to use it anymore. This will result in a degraded experience on your front office.

en	Delete the images linked to this image setting

en	Regenerate thumbnails for the selected images? With the "erase" option enabled, the previously selected thumbnails will be deleted.

en	Current theme is unavailable. Please check your theme's directory name ("%s") and permissions.

en	Duplicate images were found when moving the product images. This is likely caused by unused demonstration images. Please make sure that the folder %folder% only contains demonstration images, and then delete it.

en	Incorrect value for the selected JPEG image compression.

en	Incorrect value for the selected PNG image compression.

en	Incorrect value for the selected WebP image compression.

en	Source file does not exist or is empty (%filepath%)

en	Failed to resize image file (%filepath%)

en	Failed to resize image file to high resolution (%filepath%)

en	Original image is corrupt (%filename%) for product ID %id% or bad permission on folder.

en	Original image is missing or empty (%filename%) for product ID %id%

en	Cannot write images for this type: %1$s. Please check the %2$s folder's writing permissions.

en	Only part of the images have been regenerated. The server timed out before finishing.

en	Server timed out. The watermark may not have been applied to all images.

en	Cannot write "No picture" image to %s images folder. Please check the folder's writing permissions.

en	Error: Your server configuration is not compatible with the new image system. No images were moved.

en	Not all images have been moved. The server timed out before finishing. Click on "%move_images_label%" again to resume the moving process.

en	Error: Some -- or all -- images cannot be moved.

en	After modification, do not forget to regenerate thumbnails

en	Make sure the theme you use doesn't rely on this image format before deleting it.

en	This name already exists.

en	An error occurred. The information "%s" is missing.

en	An error occurred. The template "%s" is missing.

en	An error occurred while uploading the favicon: cannot copy file "%s" to folder "%s".

en	Your theme has been correctly exported: %path%

en	The page Category cannot be moved here.

en	Your RTL stylesheets has been generated successfully

en	Your theme has been correctly reset to its default settings. You may want to regenerate your images. See the Improve > Design > Images Settings screen for the '%regenerate_label%' button.

en	There is already a theme %theme_name% in your themes folder. Remove it if you want to continue.

en	Failed to delete theme. Make sure you have permissions and theme is not used.

en	Cannot adapt theme to RTL languages.

en	Invalid file format.

en	Warning: if no email logo is available, the main logo will be used instead.